\pdfoutput1

% In the following text, the fonts are quite messed up:
Hello {\tentt world} with Lua\TeX. Hello {\tentt world} with Lua\TeX.
Hello {\tentt world} with Lua\TeX. Hello {\tentt world} with Lua\TeX.
Hello {\tentt world} with Lua\TeX. Hello {\tentt world} with Lua\TeX.
Hello {\tentt world} with Lua\TeX. Hello {\tentt world} with Lua\TeX.

% The following text is typeset in a narrow column and cut off at the 
% left. This also happens when font expansion is turned off (but not 
% in pdfTeX 1.40.3).
This is just {\tentt test}. Just a {\tentt test}. Nothing more than a
{\tentt test}. Just a {\tentt test}. Nothing more than a {\tentt
test}. Just a {\tentt test}. Nothing more than a {\tentt test}. Just a
{\tentt test}. Nothing more than a {\tentt test}. Just a {\tentt
test}. Nothing more than a {\tentt test}. Just a {\tentt test}.
Nothing more than a {\tentt test}.

% The following text is typeset in a narrow column as well:
This is just test. Just a test. Nothing more than a test. Just a test.
Nothing more than a test. Just a test. Nothing more than a test. Just
a test. Nothing more than a test. Just a test. Nothing more than a
test. Just a test. Nothing more than a test.

% The following *was* typeset across the whole page, until I added 
% the `-- not' et cetera:
Some more text, just to check if the weird typesetting of the last
paragraph can be repeated. Still, it would be strange if not. But it
looks like -- not, at least if the paragraph is short. If it is
longer, the text is typeset incorrectly.

% The following is typeset across the whole page, just like it should 
% be:
But only if the paragraph is a little bit longer, a few lines.



\bye
