\unprotect

\def\OTRONEdosomepagefloat#1[#2]%
  {%\checkwaitingfloats{#1}%
   \global\setbox#1\vbox
     {\unvbox#1%
      \vbox to \textheight
        {\doifnotinset\v!high{#2}\vfill
         \box\floatbox
         \doifnotinset\v!low{#2}\vfill}%
      \goodbreak}%
   \doinsertfloatinfo
   \nonoindentation}

\protect

\endinput
