\setuppapersize[legal]
\setuplayout[header=0in,footer=0in,topspace=0.75in,backspace=1.25in]
\setuppagenumbering[location=]
\setupbodyfont[11pt]
\starttext
%\showlayout[pt,in]
%\showbodyfont
\define\unused{
{\inframed
 [foregroundstyle=type,
  background=color,
  backgroundcolor=gray,
  frame=off]
{\tt [Unused]}}
}
\def\spare{\dosingleempty\doSpare}
\def\doSpare[#1]{%
	\iffirstargument
		{\tt [#1]}
	\else
		{\tt [15A]}
	\fi
	{\tt [Spare]}
}
\startalignment[center]
{\tfb Electrical Room Electrical Panel}
\blank
{\tfa\sc Electrical Panel}
\blank
{\tfa Panel Model: Siemens}
\blank
{\tfb \tt [DRAFT---To Be Verified]}
\blank[2*big]
\stopalignment

\setupTABLE[frame=off]
\setupTABLE[r][each][height=0.35in]
\setupTABLE[c][1,3][align={center,lohi},width=0.75in]
\setupTABLE[c][2,4][align={flushleft,lohi},width=2.25in,loffset=0.1in]
\setupTABLE[r][4,6][topframe=on]
\setupTABLE[r][1][topframe=on,bottomframe=on]
\setupTABLE[r][last][bottomframe=on]

\midaligned{
\bTABLE
\bTABLEbody
	\bTR
		\bTD Circuit \eTD
		\bTD Description \eTD
		\bTD Circuit \eTD
		\bTD Description \eTD
	\eTR
%	\bTR
%		\bTD [nr=2] 5 \eTD \bTD [nr=2] Bedrooms 2+3 Arc Fault Plugs \eTD
%		\bTD [nr=2] 6 \eTD \bTD [nr=2] Roof Heating Cable \eTD
%	\eTR
	\bTR
		\bTD [nr=2] 7 \eTD \bTD [nr=2] Bedroom 4 Arc Fault Plug \eTD
		\bTD [nr=2] 8 \eTD \bTD [nr=2] \unused \eTD
	\eTR
\eTABLEbody
\eTABLE
}
\stoptext
