\setuppapersize[letter]
\setuplayout[header=0in,footer=0in,topspace=0.75in,backspace=1.25in]
\setuppagenumbering[location=]
\switchtobodyfont[11pt]
\starttext
\startalignment[center]
\placetable[here][]{none}
\starttable[|cw(0.75in)|lw(1.5in)|cw(0.75in)|lw(1.5in)|]
\HL
\NC {\sc Circuit} \NC {\sc Description} \VL {\sc Circuit} \NC {\sc Description} \NC\SR
\HL
\NC \LOW{7} \NC \LOW{Bedrooms 2+3 Arc Fault Plug} \VL \LOW{8} \NC \LOW{\tt Unused} \NC\FR
\DC \DC \VL \NC \NC\MR
\HL
\NC \LOW{9} \NC \LOW{Bedroom 4 Arc Fault Plug} \VL \LOW{10} \NC \LOW{\tt Spare} \NC\FR
\DC \DC \VL \NC \NC\MR
\HL
\stoptable
\stoptext
