\setupbodyfont[xits]

\setupinteraction[state=start]

\useurl[context2008][http://wiki.contextgarden.net/Context_2008.04.10][][\ConTeXt\ version 4/10/2008]

\starttext
Using the NEO keyboard layout several math symbols can be inserted directly like $∫$ or $∩$.

But $\int$ by \type{\int} and $∫$ by UTF-8 character look differently. As Mojca pointed out \type{\intop} is also not type set correctly: $\intop$. This suggests that it is a problem with the Latin Modern font. \type{\intop} was added in \from[context2008].

\blank

• Using UTF-8 character:
\startformula
  ∫_ℝ dx = ∞
\stopformula

• Using UTF-8 character with \type{\nolimits}:
\startformula
  ∫\nolimits_ℝ dx = ∞
\stopformula

• Using \type{\intop}:
\startformula
  \intop_ℝ dx = ∞
\stopformula

• Using \type{\intop\nolimits} does not work.
\startformula
  \intop\nolimits_ℝ dx = ∞
\stopformula

• Using \type{\int}:
\startformula
  \int_ℝ dx = ∞
\stopformula

• Using \type{\int_\limits_a}:
\startformula
  \int\limits_a dx = ∞
\stopformula

\blank
\CONTEXT\ \contextmark\ \contextversion
\stoptext
