\starttext
contextversie: \contextversion\blank
\midaligned{\bf Testing \type{\hbadness}}\blank
Default value of \type{\hbadness} = \the\hbadness\crlf
\hbox to2cm{Overfull hbox}\crlf
The log: \type{\hbox (11.94066pt too wide) detected at line 5}\blank

\hbadness=10000\relax
New value of \type{\hbadness} = \the\hbadness{} (larger values no effect)\crlf
\hbox to2cm{Overfull hbox}\crlf
The log: \type{\hbox (11.94066pt too wide) detected at line 10}\blank
Question: Why is the log message not suppressed because of hbadness?
No value of hbadness makes the comlaint disappear, not even 100000 or 1000000.
\stoptext
