\usemodule[bib]
%\usemodule[bibltx]
\setupheadtext[sv][pubs=Litteraturh��nvisning]
\setupbibtex[database=test]
%\usepublications[uppsatsGJ2009]
\setuppublications[state=start,alternative=apa,criterium=all,refcommand=authoryear]
\setuppublicationlist[author=\invertedauthor,artauthor=\invertedauthor,editor=\invertedauthor]
\setupcite[authoryear][andtext={ och },compress=no]



\starttext
\section{test}
When citing this author it makes an annoying new line.  Eva \cite[Hultin2007]. But this reference \cite[2005tmo] keeps at the same line. This is bad because i'm writing a thesis right now and this doesn't look good.
\stoptext
