\usemodule[bib]
\setupinteraction[state=start]
\setuppublications[alternative=apa-de]

\startpublication[k=BMPINTERBC,
				  t=misc,
				  a={{Wikipedia}},
				  y=2008e,
				  u={http://en.wikipedia.org/wiki/Image:Thisisaveryveryveryverylongurlthatisnotwrapped.png},
				  n=11,
				  s=Wik08e]
  \author[]{}[]{}{Wikipedia}
  \pubyear{2008\maybeyear{e}}
  \title{{Image:BicubicInterpolationExample.png} --- {W}ikipedia{,} the free encyclopedia}
  \month{3}
  \biburl{http://en.wikipedia.org/wiki/Image:Thisisaveryveryveryverylongurlthatisnotwrapped.png},
\stoppublication

\starttext

The URL in the publications doesn't warp: \cite[BMPINTERBC].  And this one, too, doesn't
wrap: \useURL{http://en.wikipedia.org/wiki/Image:Thisisaveryveryveryverylongurlthatisnotwrapped.png}.
And this one, isn't better: \hyphenatedurl{http://en.wikipedia.org/wiki/Image:Thisisaveryveryveryverylongurlthatisnotwrapped.png}

\section{References}
\placepublications[criterium=all]
\stoptext

