
\starttypescript [serif] [MinionPro] [name]
  \definefontsynonym [Serif]       [Minion-Regular]
  \definefontsynonym [SerifItalic] [Minion-Italic]
\stoptypescript

\starttypescript [serif] [MinionPro] [name]
  \definefontsynonym [Minion-Regular] [name:MinionPro-Regular] [features=default] 
  \definefontsynonym [Minion-Italic]  [name:MinionPro-It]      [features=default]
\stoptypescript

\starttypescript [MinionPro]
  \definetypeface [minion] [rm] [serif] [MinionPro] [default] 
\stoptypescript


\usetypescript[MinionPro]
\setupbodyfont[minion,12pt]


\setupwhitespace[big]

% \setupinterlinespace[big]        % not OK
% \setupinterlinespace[line=3.5ex] % OK

%% is this the best way to go?
% \setupbodyfontenvironment [minion] [default] [interlinespace=3.1ex]
\setupbodyfontenvironment [minion] [18pt] [interlinespace=10ex]
\setupbodyfontenvironment [minion] [12pt] [interlinespace=3.5ex]
\setupbodyfontenvironment [minion] [10pt] [interlinespace=3.1ex]
\setupbodyfontenvironment [minion]  [9pt] [interlinespace=2.9ex]

%% there's no Difference between \setupbodyfontenvironment and
%% \definebodyfontenvironment? 


\setuphead
  [chapter]
  [style={\switchtobodyfont[18pt]}]
  % [style=\tfa]

\setupdelimitedtext
  [blockquote]
  [style={\switchtobodyfont[10pt]}] % no bodyfont-command

\setupfootnotes[bodyfont=9pt]


\starttext  \showframe[text]

% \setupinterlinespace[big] % OK


\chapter{The space before and after the first line ist bigger than it
  should. The rest ist not proberly interline spaced. The space before and after the first line ist bigger than it
  should. The rest ist not proberly interline spaced.}

\input tufte 


\startblockquote
  \input tufte \par \input tufte \par % !!
\stopblockquote

\input tufte

And now a footnote\footnote{\input tufte}

\stoptext

%%% Local Variables: 
%%% mode: context
%%% TeX-master: t
%%% End: 
